\chapter{Configuration Guide}
\label{configuration_guide}

This chapter is an important part for all PIPS contributors who want
to configure, develop or maintain the PaWS framework. The current
configuration of the project and the ways to change it are discussed
here. Also possible extensions and additions are presented. The last
sections contain the information about PaWS installation and
deployment.

\input{reportCh3/current_configuration}

\input{reportCh3/extension}

\input{reportCh3/launching}

\input{reportCh3/installation}

\section{Conclusion}

The PaWS framework was designed to be fully configurable by anybody
with a good knowledge of PIPS. It does not require any knowledge of
the WEB software technologies used to develop PaWS.

